<script>
/* eslint-disable no-console */
import '../assets/index.less'
import Cascader from '../index'

const addressOptions = [{
  label: '福建',
  value: 'fj',
  children: [{
    label: '福州',
    value: 'fuzhou',
    children: [{
      label: '马尾',
      value: 'mawei',
    }],
  }, {
    label: '泉州',
    value: 'quanzhou',
  }],
}, {
  label: '浙江',
  value: 'zj',
  children: [{
    label: '杭州',
    value: 'hangzhou',
    children: [{
      label: '余杭',
      value: 'yuhang',
    }],
  }],
}, {
  label: '北京',
  value: 'bj',
  children: [{
    label: '朝阳区',
    value: 'chaoyang',
  }, {
    label: '海淀区',
    value: 'haidian',
  }],
}]

export default {
  data () {
    return {
      inputValue: '',
    }
  },
  methods: {
    onChange (value, selectedOptions) {
      console.log(value, selectedOptions)
      this.inputValue = selectedOptions.map(o => o.label).join(', ')
    },
  },

  render () {
    return (
      <Cascader options={addressOptions} onChange={this.onChange} transitionName='slide-up'>
        <input value={this.inputValue}/>
      </Cascader>
    )
  },
}
</script>
